\documentclass[11pt,a4paper]{report}
\usepackage{fancyheadings,graphics, makeidx}               
\makeindex
%\textwidth 15cm
%\textheight 21cm
%\oddsidemargin 0.5cm
%\topmargin 0cm
%\parindent 0cm
%\nofiles            

\title{MathML-OpenMath Interface\\ for REDUCE}
\author{Luis Alvarez Sobreviela}

\begin{document}

\maketitle        

\input ptitle

\tableofcontents
                    
\pagestyle{fancy}

\rhead{\thepage}

\lfoot{Luis Alvarez Sobreviela}

\rfoot{OpenMath/MathML Interface}

\cfoot{}

\setlength{\footrulewidth}{0.4pt}

\setcounter{page}{1}                    
              
\newpage

\input introduction

\input analysis

\input design

\input testing

\newpage

\input cds

%\newpage

%\input mml

%\newpage

%\input ptitle

\input bib

\end{document}

                      
