% Verbal description for system Isothermal (Isothermal_desc.tex)
% Generated by MTT on Thu Dec 4 15:59:55 GMT 1997.

% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% Version control history
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% $Id$
% %% $Log$
% Revision 1.1  1997/12/09  12:30:26  peterg
% Initial revision
%
% Revision 1.1  1997/12/08  09:37:04  peterg
% Initial revision
%
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

