% Verbal description for system RC (RC_desc.tex)
% Generated by MTT on Tue Aug 26 09:43:25 BST 1997.

% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% Version control history
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% $Id$
% %% $Log$
% %% Revision 1.1  1997/08/26 09:28:25  peterg
% %% Initial revision
% %%
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\textbf{RC} is a Simple two-port RC circuit.  The two ports are [in]
and [out] and the two parameters are c and r respectively

   The acausal bond graph of system \textbf{RC} is
   displayed in Figure \Ref{RC_abg} and its label
   file is listed in Section \Ref{sec:RC_lbl}.
   The subsystems are listed in Section \Ref{sec:RC_sub}.
