% -*-latex-*- Put EMACS into LaTeX-mode
% Verbal description for system CDx (CDx_desc.tex)
% Generated by MTT on Thu Apr 19 10:28:34 BST 2001.

% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% Version control history
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% $Id$
% %% $Log$
% %% Revision 1.1  2000/12/28 09:13:38  peterg
% %% Initial revision
% %%
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

   The acausal bond graph of system \textbf{CDx} is
   displayed in Figure \Ref{fig:CDx_abg.ps} and its label
   file is listed in Section \Ref{sec:CDx_lbl}.

   This component is a standard compliance except that:
   \begin{itemize}
   \item There is an additional output equal to the integrated flow
     variable
   \item the re is a single parameter $c$ -- the compliance.
   \end{itemize}

