% Verbal description for system Load (Load_desc.tex)
% Generated by MTT on Thu Jul 3 13:58:38 BST 1997.

% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% Version control history
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
% %% $Id$
% %% $Log$
% %%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

   The acausal bond graph of system \textbf{Load} is
   displayed in Figure \Ref{Load_abg} and its label
   file is listed in Section \Ref{sec:Load_lbl}.
   The subsystems are listed in Section \Ref{sec:Load_sub}.
